.-
help for ^circhist^
.-

Histogram for circular data with wrapping round of bins
-------------------------------------------------------

    ^circhist^ varname [weight] [^if^ exp] [^in^ range]
    [ ^,^ ^p^ad^(^#^) h^istplot { graph_options | histplot_options } ]

Description
-----------

^circhist^ produces a histogram for varname with some wrapping round of
bins. varname should be a circular variable taking on values between 0
and 360 degrees.

Options
-------

^pad(^#^)^ places a pad of # degrees at each end. Data less than or
    equal to # degrees are copied at the right end of the axis for a
    horizontal interval of 360 to 360+# degrees. Data more than 360-#
    degrees are copied at the left end of the axis for a horizontal
    interval of -# to 0 degrees. The default is 180, so that a full two
    cycles are shown.

^histplot^ indicates that ^histplot^ is to be used instead of ^graph,^
    ^histogram^ to draw the graph. ^histplot^, ^genfreq^ and ^barplot^
    must be installed if this option is specified.

graph_options are any of the options allowed with ^graph, histogram^;
    see help for ^graph^. The use of ^xsc^ is strongly recommended to
    reduce puzzling details.

histplot_options are any of the options allowed with ^histplot^;
    see help for ^histplot^.


Examples
--------

        . ^circhist wallasp, xsc(-180,540) bin(24)^
        . ^circhist wallasp, pad(45) xsc(-45,405) bin(20)^
          ^xla(0,90,180,270,360) yla freq^
        . ^circhist wallasp, pad(45) xsc(-45,405) h w(10)^
          ^xla(0,90,180,270,360) yla^


Author
------
         Nicholas J. Cox, University of Durham, U.K.
         n.j.cox@@durham.ac.uk


Also see
--------

On-line: help for @graph@, @circnpde@, @histplot@ (if installed)

